0 0.5 1

15.6 15.9 16.2 16.5

   MDV40 RRAB 0.759705
B

0 0.5 1

14.6 14.8 15 15.2 15.4

   MDV41 RRAB 0.734964
B

0 0.5 1

15.4 15.6 15.8 16

    MDV43 EB 0.528001
B

0 0.5 1

15.4

15.6

15.8

    MDV45 EW 0.381209
B

0 0.5 1

15.6 15.8 16 16.2 16.4

   MDV46 RRAB 0.404791
B

0 0.5 1

15.6 15.8 16 16.2

    MDV47 EW 0.383012
B

0 0.5 1

15 15.5 16

   MDV49 RRAB 0.612771
B

0 0.5 1

15.4 15.6 15.8 16 16.2

   MDV51 RRAB 0.676667
B

0 0.5 1

15.2 15.4 15.6 15.8

    MDV53 EW 0.353475
B

0 0.5 1

14.8 15 15.2 15.4

    MDV54 EW 0.315782
B

0 0.5 1

16 16.5 17

   MDV55 RRAB 0.641829
B

0 0.5 1

15.6 15.8 16 16.2

    MDV56 EW 0.254585
B

0 0.5 1

15.9 16.1 16.3 16.5

     MDV58 EA 0.98930
B

0 0.5 1

14.6

14.8 15

    MDV59 EB 0.473063
B

0 0.5 1

15.8 16 16.2

    MDV60 RRC 0.310296
B

0 0.5 1

15 15.5 16

   MDV61 RRAB 0.640799
B

0 0.5 1

14.6 14.8 15 15.2 15.4

   MDV63 RRC: 0.443354
B

0 0.5 1

15.5

16

16.5

   MDV64 RRAB 0.614422
B

0 0.5 1

14.2

14.4

14.6

   MDV66 RRAB 0.721473
B

0 0.5 1

15.9 16 16.1 16.2

    MDV67 EW 0.378639
B

0 0.5 1

15.4 15.6 15.8 16 16.2

    MDV68 RRC 0.392512
B

0 0.5 1

15.2

15.4

15.6

15.8

   MDV71 RRAB: 0.392501
B

0 0.5 1

15 15.2 15.4 15.6

    MDV72 RRC 0.322902
B

0 0.5 1

15.4 15.6 15.8

   MDV73 HADS 0.0999541
B

0 0.5 1

14 14.5 15 15.5

   MDV75 RRAB 0.487961
B

0 0.5 1

15 15.2 15.4 15.6 15.8

    MDV77 RRC 0.318240
B

0 0.5 1

15 15.2 15.4 15.6

    MDV78 EW 0.412666
B

0 0.5 1

15 15.2 15.4 15.6

     MDV79 EA 1.68149
B

0 0.5 1

15.2 15.4 15.6 15.8 16

    MDV81 RRC 0.292674
B

0 0.5 1

16 16.2

16.4

    MDV82 RRC 0.336160
B

0 0.5 1

15.4

15.6

15.8 16

    MDV83 EW 0.355982
B

0 0.5 1

15.6

15.8

16

    MDV84 EW 0.429948
B

0 0.5 1

15.9 16 16.1 16.2 16.3

    MDV85 RRC 0.256808
B

0 0.5 1

16 16.2 16.4 16.6

   MDV87 RRAB 0.584480
B

0 0.5 1

15.6 15.8 16 16.2 16.4

    MDV88 RRC 0.284575
B

0 0.5 1

14.4 14.6 14.8 15

    MDV89 EW 0.677689
B